Re: Pymods Feedback

Played >100 hours with a friend. We are both very hardcore mod players of minecraft and factorio. Keep that in mind as our feedback will likely be skewed.

[*]I think early game is fine-ish. It's a bit cumbersome but not terribly so. It sets the mood right.
[*]Speaking of the mood -- the night is terrible. Lights do jack-shit. Afraid of the dark mod is essential just because of how crappy lights are and night vision is too far away. Would be fantastic if we could increase light range.
[*]The biggest disappointment is balance of the game.

Electrolysis should be far more expensive.

Other gas burning should give more power.

Balance of higher tier processing isn't always better then lower tier, and it's very hard to figure that out

Glass is essential but harder to procure then anything else early game with no tech options for it really

Some power options are just eh.

Higher level machines are expensive and IMHO not worth it at all.

Statistics: Posted by shadowpho — Fri Sep 20, 2019 6:12 pm