Re: [0.17.68] Bots not building all Landfill

You have 59,119 landfill waiting to be built. The game only sends a few robots per tick to work on them assuming the ones it checks that tick are in range of robots.

At the best case it will take 5.4 minutes to go over them all once.

You need to build less landfill and wait for the robots to finish what you've built
Statistics: Posted by Rseding91 — Fri Sep 06, 2019 4:26 am