Re: Fluids how can hold xy% in a tank - "fluid control" and "Angels" (also bobs and AAI) mods are on board

The circuit condition setup wouldn't be too bad, you could do it with a single pump.

Set the pump on the input for X and set the circuit condition to "on when fluid amount is < 40%".
Set an additional overflow pipe to the sewage and you're done.

Y and Z will always be on. When the amount is > 80% the overflow kicks in and starts draining it off to wastewater.
X will only kick on when the amount is < 40%.
Statistics: Posted by xfir01 — Mon Mar 18, 2019 9:25 pm