[done] Fluids how can hold xy% in a tank - "fluid control" and "Angels" (also bobs and AAI) mods are on board

He guys, a little problem.

i have one production X. for fluid A.
I have another production Y. there produce also fluid A. but as an byproduct
I have a production Z. who need fluid A.

The first production only need to product if production Y are to slow.
The tank are not allowed to overflow because production y stops.
The tank are not allowed to underflow because production Z are stops.

The mods "Fluid Controll" and "Angels" have pipes with overflow 80% and underflow 80% but this is exact my problem. Both are 80%.
What i need is something like this -

If the tank are 80% full than production X dont let new fluids flow in the tank and the tank waste the fluid in a sewage plant.
If the tank are maybe 60% full than production X dont let new fluids flow in the tank and the tank dont waste the fluid in a sewage plant.
If the tank are maybe 40% full than production X must let new fluids flow in the tank and the tank dont waste the fluid in a sewage plant.

Is there a way without red- and greenwire chaos?
Statistics: Posted by FritzHugo3 — Mon Mar 18, 2019 8:54 pm