Re: Fluids how can hold xy% in a tank - "fluid control" and "Angels" (also bobs and AAI) mods are on board

You want to connect the tank to the pump directly (no combinators needed). And then set the enabled condition on the pump to be the numerical value for 40% of whatever the capacity of the tank is.

Here I'm using a standard storage tank, so 25,000 * .4 = 10,000. And you'll want to set the check condition to use the fluid type you're storing, so for example, enable when Sulfuric Waste water < 10k.
Statistics: Posted by xfir01 — Mon Mar 18, 2019 11:16 pm