Re: Fluids how can hold xy% in a tank - "fluid control" and "Angels" (also bobs and AAI) mods are on board

Realy i hate this circuits ^^.

Ok, i have from the tank a cable to the input from an Arithmic combinator (right?)
The yellow * for input, than % than 40
Output is green color (the yellow X are not working because the pump havent this option)

Than i have a wire from the Arithmic combinator to the normal vanila pump
Input is the green color (returns the % input from the combinator right?), >, 40

What i do wrong?

(Why cant have the pumps directly have an option for % xy on/off ^^ like the traintanks)

Realy thx xfir01 for youre guide and sorry for my english, the school are a long time ago .
Du sprichst nicht zufällig Deutsch grins just a joke.
Statistics: Posted by FritzHugo3 — Mon Mar 18, 2019 10:48 pm