Creating a timer

Hey , is it possible with combinators to create a timer that works like so, any signal will go in and is delayed on the output (the output signal can be 1 or the input count). The output shall remain until the input is gone. And this should also work for every signal in parallel which is my problem. I cannot achieve this.
I can delay the output, but i can only either make the reset work, or make it work for any signal but not both.
Thanks
Statistics: Posted by aober93 — Fri Sep 09, 2016 5:31 pm