Re: Creating a timer

Let me get this straight:
Any input signal should be delayed by a certain amount of time (say 5 seconds), before being output. You also want this to happen in parallel for multiple types of signals. However when the input is turned off, do you want the output to turn off immediately, or with a delay?

Edit: What about if the value of the signal changes, do you want the change reflected immediately or with a delay?
Statistics: Posted by Lupoviridae — Fri Sep 09, 2016 8:39 pm