Re: Repair Tower

A CPU can handle 10,000 flying bots, that cannot collide, but not 10,000 walking bots, which then will collide endless.

Have them walk over each other like ants
Statistics: Posted by Zeblote — Fri Jul 24, 2015 4:15 pm