Re: Let's overhaul smart belt!

Worth noting something for the people reading this that there is a long and still ongoing „debate“ / talk / whatever going on in the steelaxe dc. Not sure if we want to / are allowed to link to it or move the entire discussion on here.
Statistics: Posted by pantabo1 — Thu Aug 14, 2025 4:11 pm